0123456742.0

36.0

0:37:30.0

30.0

05:00.0

43:04:00.0

03:00.0

02:30.0

RA (J2000)

Dec (J2000)

OBSID 00872556000 / DATE-OBS 2018-11-19T08:20:40.3

UVOT Finding Chart