05101520253052.0

46.0

0:13:40.0

34.0

27:00.0

30.0

28:00.0

29:00.0

-54:30:00.0

RA (J2000)

Dec (J2000)

OBSID 00813721000 / DATE-OBS 2018-03-11T18:08:49.7

UVOT Finding Chart