0510152025303540455054.0

20:23:50.0

46.0

42.0

38.0

30.0

52:00.0

51:00.0

33:50:00.0

49:30.0

RA (J2000)

Dec (J2000)

OBSID 00668877000 / DATE-OBS 2015-12-30T22:28:28.1

UVOT Finding Chart