0123456745.0

5:56:40.0

35.0

30.0

57:30.0

-57:58:00.0

59:00.0

-58:00:00.0

RA (J2000)

Dec (J2000)

OBSID 00633180000 / DATE-OBS 2015-03-01T19:43:15.3

UVOT Finding Chart