051015202530354008.0

04.0

0:52:00.0

56.0

51:52.0

30.0

07:00.0

45:06:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00603243000 / DATE-OBS 2014-07-03T00:39:32.3

UVOT Finding Chart