051015202522.0

16.0

16:49:10.0

04.0

30.0

46:00.0

52:45:00.0

44:00.0

43:30.0

RA (J2000)

Dec (J2000)

OBSID 00591392000 / DATE-OBS 2014-03-11T22:11:19.5

UVOT Finding Chart