0.0005

0.001

0.0015

0.002

0.0025

0.003

0.0035

0.004

0.0045

28.0

24.0

17:34:20.0

16.0

22:30.0

23:00.0

30.0

-30:24:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00569022000 / DATE-OBS 2013-09-01T09:15:39.7

UVOT Finding Chart