05101520258:36:00.0

56.0

52.0

35:48.0

-43:10:00.0

30.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 00525261000 / DATE-OBS 2012-06-27T23:47:22.7

UVOT Finding Chart