024681032.0

26.0

2:34:20.0

14.0

46:30.0

47:00.0

30.0

-43:48:00.0

49:00.0

RA (J2000)

Dec (J2000)

OBSID 00516027000 / DATE-OBS 2012-02-24T19:12:38.2

UVOT Finding Chart