20.0

10.0

16:20:00.0

55:30.0

56:00.0

30.0

-59:57:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 00287088000 / DATE-OBS 2007-08-05T20:28:44.8

UVOT Finding Chart