7:41:50.0

7:41:20.0

7:40:50.0

10:00.0

15:00.0

-20:20:00.0

25:00.0

RA (J2000)

Dec (J2000)

OBSID 00283320000 / DATE-OBS 2007-06-28T15:02:52.9

UVOT Finding Chart