21:35:18.0

21:35:12.0

21:35:06.0

47:30.0

48:00.0

30.0

49:00.0

-24:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00282808000 / DATE-OBS 2007-06-21T23:21:27.9

UVOT Finding Chart