50.0

2:08:40.0

30.0

58:00.0

56:57:00.0

56:00.0

55:30.0

RA (J2000)

Dec (J2000)

OBSID 00282445000 / DATE-OBS 2007-06-16T16:46:00.3

UVOT Finding Chart