29:00.0

0:27:00.0

25:00.0

74:20:00.0

15:00.0

10:00.0

RA (J2000)

Dec (J2000)

OBSID 00280958000 / DATE-OBS 2007-05-31T02:24:45.3

UVOT Finding Chart