04.0

18:55:00.0

56.0

54:52.0

30.0

41:00.0

20:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 00280706000 / DATE-OBS 2007-05-29T13:02:54.6

UVOT Finding Chart