30.0

18:55:00.0

54:30.0

45:00.0

20:40:00.0

35:00.0

30:00.0

RA (J2000)

Dec (J2000)

OBSID 00280706000 / DATE-OBS 2007-05-29T12:50:43.8

UVOT Finding Chart