55:00.0

12:53:00.0

51:00.0

05:00.0

75:00:00.0

74:50:00.0

RA (J2000)

Dec (J2000)

OBSID 00279817000 / DATE-OBS 2007-05-20T13:07:59.7

UVOT Finding Chart