15:00.0

15:14:00.0

13:00.0

20:00.0

51:10:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00276045000 / DATE-OBS 2007-04-18T11:35:38.1

UVOT Finding Chart