59:00.0

17:58:00.0

57:00.0

40:00.0

45:00.0

-63:50:00.0

55:00.0

RA (J2000)

Dec (J2000)

OBSID 00273180000 / DATE-OBS 2007-03-30T22:52:38.5

UVOT Finding Chart