3:14:30.0

13:30.0

-42:50:00.0

55:00.0

-43:00:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 00271019000 / DATE-OBS 2007-03-18T07:31:57.5

UVOT Finding Chart