14.0

11:56:10.0

06.0

02.0

18:30.0

19:00.0

30.0

-13:20:00.0

21:00.0

RA (J2000)

Dec (J2000)

OBSID 00261880000 / DATE-OBS 2007-02-24T20:44:06.7

UVOT Finding Chart