30.0

3:05:00.0

04:00.0

15:00.0

-47:20:00.0

25:00.0

30:00.0

RA (J2000)

Dec (J2000)

OBSID 00259803000 / DATE-OBS 2007-02-09T03:36:52.1

UVOT Finding Chart