2:28:40.0

2:28:10.0

2:27:40.0

50:00.0

45:00.0

11:40:00.0

35:00.0

RA (J2000)

Dec (J2000)

OBSID 00258408000 / DATE-OBS 2007-01-29T23:39:19.4

UVOT Finding Chart