50.0

2:12:30.0

10.0

31:30.0

32:00.0

30.0

-73:33:00.0

34:00.0

RA (J2000)

Dec (J2000)

OBSID 00257741000 / DATE-OBS 2007-01-26T02:35:30.8

UVOT Finding Chart