10:38:30.0

10:37:30.0

05:00.0

-53:10:00.0

15:00.0

20:00.0

RA (J2000)

Dec (J2000)

OBSID 00255029000 / DATE-OBS 2007-01-07T12:21:31.6

UVOT Finding Chart