012345617:44:56.0

17:44:50.0

17:44:44.0

33:00.0

30.0

-39:34:00.0

35:00.0

36:00.0

RA (J2000)

Dec (J2000)

OBSID 03000141001 / DATE-OBS 2025-10-16T18:21:23.1

UVOT Finding Chart