02468101214161844.0

21:35:40.0

36.0

32.0

49:30.0

-41:50:00.0

30.0

51:00.0

52:00.0

RA (J2000)

Dec (J2000)

OBSID 01404126000 / DATE-OBS 2025-10-14T21:57:57.1

UVOT Finding Chart