4E-17

3E-17

2E-17

1E-17

0-1E-17

-2E-17

-3E-17

-4E-17

21:36:00.0

40.0

20.0

35:00.0

44:00.0

46:00.0

48:00.0

-41:50:00.0

52:00.0

54:00.0

56:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 01404126000 / DATE-OBS 2025-10-14T21:57:57.1

UVOT Finding Chart