0510152025303548.0

44.0

5:02:40.0

36.0

30.0

54:00.0

16:53:00.0

52:00.0

51:30.0

RA (J2000)

Dec (J2000)

OBSID 01401726000 / DATE-OBS 2025-10-05T16:21:56.4

UVOT Finding Chart