05101520253020.0

10.0

1:14:00.0

30.0

31:00.0

56:30:00.0

29:00.0

28:00.0

RA (J2000)

Dec (J2000)

OBSID 01400964000 / DATE-OBS 2025-10-03T02:00:25.4

UVOT Finding Chart