051015202530354048.0

44.0

2:50:40.0

36.0

-23:00:00.0

30.0

01:00.0

02:00.0

03:00.0

RA (J2000)

Dec (J2000)

OBSID 01400467000 / DATE-OBS 2025-10-01T14:32:17.5

UVOT Finding Chart