051015202530354050.0

40.0

3:27:30.0

20.0

10.0

41:00.0

30.0

74:40:00.0

39:00.0

38:30.0

RA (J2000)

Dec (J2000)

OBSID 01351790000 / DATE-OBS 2025-09-24T08:33:24.5

UVOT Finding Chart