4E-15

3E-15

2E-15

1E-15

0-1E-15

-2E-15

-3E-15

-4E-15

28:00.0

40.0

20.0

3:27:00.0

42:00.0

30.0

41:00.0

74:40:00.0

39:00.0

38:00.0

37:00.0

RA (J2000)

Dec (J2000)

OBSID 01351790000 / DATE-OBS 2025-09-24T08:24:56.5

UVOT Finding Chart