024681012141626.0

12:29:20.0

14.0

08.0

30.0

51:00.0

47:50:00.0

49:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01351008000 / DATE-OBS 2025-09-20T08:52:18.1

UVOT Finding Chart