051015202530354034.0

19:25:30.0

26.0

22.0

30.0

08:00.0

11:07:00.0

06:00.0

05:00.0

RA (J2000)

Dec (J2000)

OBSID 01350381000 / DATE-OBS 2025-09-17T06:30:39.3

UVOT Finding Chart