02040608010012006.0

17:35:00.0

34:54.0

49:00.0

30.0

-16:50:00.0

51:00.0

52:00.0

RA (J2000)

Dec (J2000)

OBSID 01348587000 / DATE-OBS 2025-09-11T02:25:48.4

UVOT Finding Chart