05101520253035404519:50:00.0

56.0

52.0

49:48.0

58:30.0

-24:59:00.0

30.0

-25:00:00.0

01:00.0

RA (J2000)

Dec (J2000)

OBSID 01344586000 / DATE-OBS 2025-08-23T20:25:14.4

UVOT Finding Chart