02468101248.0

44.0

23:53:40.0

36.0

35:30.0

36:00.0

30.0

-28:37:00.0

38:00.0

39:00.0

RA (J2000)

Dec (J2000)

OBSID 01344131000 / DATE-OBS 2025-08-21T11:01:25.0

UVOT Finding Chart