0246810121415:32:00.0

31:50.0

16:00.0

30.0

17:00.0

-53:18:00.0

19:00.0

RA (J2000)

Dec (J2000)

OBSID 01340954000 / DATE-OBS 2025-08-09T16:56:03.8

UVOT Finding Chart