0.51.52.5350.0

1:02:40.0

30.0

05:30.0

06:00.0

-59:07:00.0

08:00.0

RA (J2000)

Dec (J2000)

OBSID 01340561000 / DATE-OBS 2025-08-07T15:48:56.8

UVOT Finding Chart