05E-17

1E-16

1.5E-16

2E-16

2.5E-16

3E-16

1:03:00.0

40.0

20.0

02:00.0

03:00.0

04:00.0

05:00.0

06:00.0

07:00.0

08:00.0

09:00.0

-59:10:00.0

11:00.0

12:00.0

RA (J2000)

Dec (J2000)

OBSID 01340561000 / DATE-OBS 2025-08-07T15:46:17.6

UVOT Finding Chart