01E-18

2E-18

3E-18

4E-18

5E-18

6E-18

7E-18

20.0

3:26:00.0

40.0

25:20.0

48:00.0

-47:50:00.0

52:00.0

54:00.0

56:00.0

58:00.0

RA (J2000)

Dec (J2000)

OBSID 01340514000 / DATE-OBS 2025-08-07T11:01:20.7

UVOT Finding Chart