0246810121416182030.0

1:37:00.0

36:30.0

23:00.0

30.0

-81:24:00.0

25:00.0

26:00.0

RA (J2000)

Dec (J2000)

OBSID 01339848000 / DATE-OBS 2025-08-05T07:08:41.5

UVOT Finding Chart