2.5E-17

2E-17

1.5E-17

1E-17

5E-18

0-5E-18

-1E-17

-1.5E-17

-2E-17

-2.5E-17

2:22:00.0

40.0

20.0

21:00.0

46:00.0

30.0

-82:47:00.0

48:00.0

RA (J2000)

Dec (J2000)

OBSID 01336720000 / DATE-OBS 2025-07-25T02:06:52.1

UVOT Finding Chart