012345678912.0

06.0

18:56:00.0

21:00.0

30.0

32:20:00.0

19:00.0

18:00.0

RA (J2000)

Dec (J2000)

OBSID 01330958000 / DATE-OBS 2025-07-06T15:51:34.0

UVOT Finding Chart