0123456708.0

04.0

17:26:00.0

30.0

17:00.0

22:16:00.0

15:00.0

RA (J2000)

Dec (J2000)

OBSID 01327910000 / DATE-OBS 2025-06-25T16:10:15.2

UVOT Finding Chart