0246810121416182044.0

22:11:40.0

36.0

32.0

45:00.0

30.0

32:44:00.0

43:00.0

42:30.0

RA (J2000)

Dec (J2000)

OBSID 01325580000 / DATE-OBS 2025-06-17T21:18:16.6

UVOT Finding Chart