051015202553:00.0

51:30.0

16:50:00.0

51:00.0

30.0

-86:52:00.0

53:00.0

54:00.0

RA (J2000)

Dec (J2000)

OBSID 01299776000 / DATE-OBS 2025-03-30T07:13:57.6

UVOT Finding Chart