024681012141638.0

34.0

10:21:30.0

26.0

30.0

6:20:00.0

19:00.0

18:00.0

17:00.0

RA (J2000)

Dec (J2000)

OBSID 01273071000 / DATE-OBS 2024-12-09T05:38:08.5

UVOT Finding Chart