02468101214161850.0

21:51:40.0

30.0

39:30.0

-56:40:00.0

41:00.0

42:00.0

RA (J2000)

Dec (J2000)

OBSID 01270788000 / DATE-OBS 2024-11-27T21:51:54.9

UVOT Finding Chart